en	Wait 2&ndash;3 minutes and try again. Some USB sticks need some rest after installing.

en	Try all other USB ports on the computer. Some USB ports cannot be used to start from.

en	[[Rufus from Windows|install/windows#rufus]]
es	[[balenaEtcher para Windows|install/windows#etcher]]

en	Make sure that you have [[verified your download of Tails|install/download]].

en	Make sure that you have verified your download.

en	Try to [[install again|install/windows#install]] on the same USB stick.

en	Try to [[install again|install/mac#install]] on the same USB stick.

en	Try to [[install again|install/linux#install]] on the same USB stick.

en	Try to [[install again|install/expert#install]] on the same USB stick.

en	Try to [[install again|clone/pc#install]] on the same USB stick.

en	Try to [[install again|clone/mac#install]] on the same USB stick.

en	Try to [[install again|install]] on the same USB stick.

en	Try to [[install again|doc/upgrade/tails#install]] on the same USB stick.

en	Try to [[install again|doc/upgrade/windows#install]] on the same USB stick.

en	Try to [[install again|doc/upgrade/mac#install]] on the same USB stick.

en	Try to [[install again|doc/upgrade/linux#install]] on the same USB stick.

en	Try to install on a different USB stick.

en	Try to use the same USB stick to start on a different computer.