en	The *Unsafe Browser* does not use Tor. The websites that you visit can see your real IP address.

en	This is why we recommend that you:

en	Only use the *Unsafe Browser* to sign in to a network using a captive portal or [[browse trusted web pages on the local network|advanced_topics/lan#browser]].

en	- Close the *Unsafe Browser* after signing in to the network.